From a54a887f6638f25750cf2b9eff704225efa658b8 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Tue, 2 Mar 1999 17:03:42 +0000
Subject: "\platform{UNIX}" should really be spelled "\platform{Unix}".

---
 Doc/lib/libcrypt.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'Doc/lib/libcrypt.tex')

diff --git a/Doc/lib/libcrypt.tex b/Doc/lib/libcrypt.tex
index 8006f046f0..f9d161509d 100644
--- a/Doc/lib/libcrypt.tex
+++ b/Doc/lib/libcrypt.tex
@@ -2,7 +2,7 @@
          Function used to check \UNIX{} passwords}
 
 \declaremodule{builtin}{crypt}
-  \platform{UNIX}
+  \platform{Unix}
 \modulesynopsis{The \cfunction{crypt()} function used to check \UNIX{}
   passwords.}
 \moduleauthor{Steven D. Majewski}{sdm7g@virginia.edu}
-- 
cgit v1.2.1

