From f42cc45f1b4c7a1e21d86abbccdb1aa9185cbaab Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Thu, 3 May 2001 04:39:10 +0000
Subject: The general iteration support is part of 2.2, not 2.1 -- fixed the
 version annotations!

Also fixed a typo noted by Neil S.
---
 Doc/lib/libexcs.tex | 1 +
 1 file changed, 1 insertion(+)

(limited to 'Doc/lib/libexcs.tex')

diff --git a/Doc/lib/libexcs.tex b/Doc/lib/libexcs.tex
index eb043fcaba..7e34bd0a36 100644
--- a/Doc/lib/libexcs.tex
+++ b/Doc/lib/libexcs.tex
@@ -243,6 +243,7 @@ Raised when an \keyword{assert} statement fails.
   This is derived from \exception{Exception} rather than
   \exception{StandardError}, since this is not considered an error in
   its normal application.
+  \versionadded{2.2}
 \end{excdesc}
 
 \begin{excdesc}{SyntaxError}
-- 
cgit v1.2.1

