From f68f2fec7df1224a031c3feed8a0ef6028cfcddd Mon Sep 17 00:00:00 2001
From: Moshe Zadka <moshez@math.huji.ac.il>
Date: Thu, 11 Jan 2001 05:41:27 +0000
Subject: Implementation of PEP-0217. This closes the PEP, and patch 103170

---
 Doc/lib/libsys.tex | 9 +++++++++
 1 file changed, 9 insertions(+)

(limited to 'Doc/lib/libsys.tex')

diff --git a/Doc/lib/libsys.tex b/Doc/lib/libsys.tex
index 2fda26e429..df32182e66 100644
--- a/Doc/lib/libsys.tex
+++ b/Doc/lib/libsys.tex
@@ -44,6 +44,15 @@ Integer specifying the handle of the Python DLL.
 Availability: Windows.
 \end{datadesc}
 
+\begin{funcdesc}{displayhook}{\var{value}}
+If \var{value} is not \code{None}, this function prints it to 
+\code{sys.stdout}, and saves it in \code{__builtin__._}.
+
+This function is called when an expression is entered at the prompt
+of an interactive Python session. It exists mainly so it can be
+overridden.
+\end{funcdesc}
+
 \begin{funcdesc}{exc_info}{}
 This function returns a tuple of three values that give information
 about the exception that is currently being handled.  The information
-- 
cgit v1.2.1

