From 96628a90c47f15f357b31d665a4222d175e17b27 Mon Sep 17 00:00:00 2001
From: Guido van Rossum <guido@python.org>
Date: Mon, 10 Apr 1995 11:34:00 +0000
Subject: typos, layout and other small things

---
 Doc/libjpeg.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'Doc/libjpeg.tex')

diff --git a/Doc/libjpeg.tex b/Doc/libjpeg.tex
index b5c14a4bf2..8215cada56 100644
--- a/Doc/libjpeg.tex
+++ b/Doc/libjpeg.tex
@@ -14,7 +14,7 @@ The \code{jpeg} module defines these functions:
 Treat data as a pixmap of width \var{w} and height \var{h}, with \var{b} bytes per
 pixel.  The data is in SGI GL order, so the first pixel is in the
 lower-left corner. This means that \code{lrectread} return data can
-immedeately be passed to compress.  Currently only 1 byte and 4 byte
+immediately be passed to compress.  Currently only 1 byte and 4 byte
 pixels are allowed, the former being treated as greyscale and the
 latter as RGB color.  Compress returns a string that contains the
 compressed picture, in JFIF format.
-- 
cgit v1.2.1

