From 6c4f003202bade83791c754cd94e28c1c2fb10fa Mon Sep 17 00:00:00 2001
From: Guido van Rossum <guido@python.org>
Date: Tue, 7 Mar 1995 10:14:09 +0000
Subject: changes (suggested) by Soren Larsen

---
 Doc/libtime.tex | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'Doc/libtime.tex')

diff --git a/Doc/libtime.tex b/Doc/libtime.tex
index 3106542b8d..1bc5ffaf2e 100644
--- a/Doc/libtime.tex
+++ b/Doc/libtime.tex
@@ -30,7 +30,7 @@ in this respect.
 \item
 The precision of the various real-time functions may be less than
 suggested by the units in which their value or argument is expressed.
-E.g. on most UNIX systems, the clock ``ticks'' only every 1/50th or
+E.g.\ on most UNIX systems, the clock ``ticks'' only every 1/50th or
 1/100th of a second, and on the Mac, it ticks 60 times a second.
 
 \end{itemize}
@@ -73,9 +73,9 @@ Nonzero if a DST timezone is defined.
 
 \begin{funcdesc}{gmtime}{secs}
 Convert a time expressed in seconds since the epoch to a tuple of 9
-integers, in UTC: year (e.g. 1993), month (1-12), day (1-31), hour
-(0-23), minute (0-59), second (0-59), weekday (0-6, monday is 0),
-julian day (1-366), dst flag (always zero).  Fractions of a second are
+integers, in UTC: year (e.g.\ 1993), month (1--12), day (1--31), hour
+(0--23), minute (0--59), second (0--59), weekday (0--6, monday is 0),
+Julian day (1--366), dst flag (always zero).  Fractions of a second are
 ignored.  Note subtle differences with the C function of this name.
 \end{funcdesc}
 
-- 
cgit v1.2.1

