From db23464715f4792298c639153dda7bfd9ad9d602 Mon Sep 17 00:00:00 2001
From: Andres Freund <andres@anarazel.de>
Date: Mon, 7 Mar 2022 18:19:56 -0800
Subject: plpython: Remove regression test infrastructure for Python 2.

Since 19252e8ec93 we reject Python 2 during build configuration. Now that the
dust on the buildfarm has settled, remove regression testing infrastructure
dealing with differing output between Python 2 / 3.

Reviewed-By: Peter Eisentraut <peter@eisentraut.org>
Reviewed-By: Tom Lane <tgl@sss.pgh.pa.us>
Discussion: https://postgr.es/m/20211031184548.g4sxfe47n2kyi55r@alap3.anarazel.de
---
 src/pl/plpython/sql/plpython_drop.sql | 4 +---
 1 file changed, 1 insertion(+), 3 deletions(-)

(limited to 'src/pl/plpython/sql/plpython_drop.sql')

diff --git a/src/pl/plpython/sql/plpython_drop.sql b/src/pl/plpython/sql/plpython_drop.sql
index 72d5d657ec..e4f373b2bc 100644
--- a/src/pl/plpython/sql/plpython_drop.sql
+++ b/src/pl/plpython/sql/plpython_drop.sql
@@ -3,6 +3,4 @@
 --
 SET client_min_messages = WARNING;
 
-DROP EXTENSION plpythonu CASCADE;
-
-DROP EXTENSION IF EXISTS plpython2u CASCADE;
+DROP EXTENSION plpython3u CASCADE;
-- 
cgit v1.2.1

