From bdc7dd6799ce6effc48de58ca9ecbec82461d8b6 Mon Sep 17 00:00:00 2001
From: Tom Lane <tgl@sss.pgh.pa.us>
Date: Sat, 3 May 2008 02:47:48 +0000
Subject: Fix plpython to not get totally confused by OUT arguments.  (It still
 doesn't support multiple OUT arguments, though.)

Hannu Krosing
---
 src/pl/plpython/sql/plpython_test.sql | 5 +++++
 1 file changed, 5 insertions(+)

(limited to 'src/pl/plpython/sql/plpython_test.sql')

diff --git a/src/pl/plpython/sql/plpython_test.sql b/src/pl/plpython/sql/plpython_test.sql
index dafcae089e..f7321ab9e0 100644
--- a/src/pl/plpython/sql/plpython_test.sql
+++ b/src/pl/plpython/sql/plpython_test.sql
@@ -143,3 +143,8 @@ SELECT * FROM test_type_record_as('obj', 'one', null, false);
 SELECT * FROM test_type_record_as('obj', null, 2, false);
 SELECT * FROM test_type_record_as('obj', 'three', 3, false);
 SELECT * FROM test_type_record_as('obj', null, null, true);
+
+SELECT * FROM test_in_out_params('test_in');
+-- this doesn't work yet :-(
+SELECT * FROM test_in_out_params_multi('test_in');
+SELECT * FROM test_inout_params('test_in');
-- 
cgit v1.2.1

