From 5809a6458450a59f8c4a7a25beaefc81cff563d1 Mon Sep 17 00:00:00 2001
From: Peter Eisentraut <peter_e@gmx.net>
Date: Sat, 16 Apr 2011 21:52:10 +0300
Subject: Set client encoding explicitly in plpython_unicode test

This will (hopefully) eliminate the need for the
plpython_unicode_0.out expected file.
---
 src/pl/plpython/sql/plpython_unicode.sql | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'src/pl/plpython/sql/plpython_unicode.sql')

diff --git a/src/pl/plpython/sql/plpython_unicode.sql b/src/pl/plpython/sql/plpython_unicode.sql
index 6b9fac682a..bdd40c40a5 100644
--- a/src/pl/plpython/sql/plpython_unicode.sql
+++ b/src/pl/plpython/sql/plpython_unicode.sql
@@ -2,6 +2,8 @@
 -- Unicode handling
 --
 
+SET client_encoding TO UTF8;
+
 CREATE TABLE unicode_test (
 	testvalue  text NOT NULL
 );
-- 
cgit v1.2.1

