From db23464715f4792298c639153dda7bfd9ad9d602 Mon Sep 17 00:00:00 2001
From: Andres Freund <andres@anarazel.de>
Date: Mon, 7 Mar 2022 18:19:56 -0800
Subject: plpython: Remove regression test infrastructure for Python 2.

Since 19252e8ec93 we reject Python 2 during build configuration. Now that the
dust on the buildfarm has settled, remove regression testing infrastructure
dealing with differing output between Python 2 / 3.

Reviewed-By: Peter Eisentraut <peter@eisentraut.org>
Reviewed-By: Tom Lane <tgl@sss.pgh.pa.us>
Discussion: https://postgr.es/m/20211031184548.g4sxfe47n2kyi55r@alap3.anarazel.de
---
 src/pl/plpython/sql/plpython_void.sql | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'src/pl/plpython/sql/plpython_void.sql')

diff --git a/src/pl/plpython/sql/plpython_void.sql b/src/pl/plpython/sql/plpython_void.sql
index 77d7f59e4c..5a1a6711fb 100644
--- a/src/pl/plpython/sql/plpython_void.sql
+++ b/src/pl/plpython/sql/plpython_void.sql
@@ -4,16 +4,16 @@
 
 CREATE FUNCTION test_void_func1() RETURNS void AS $$
 x = 10
-$$ LANGUAGE plpythonu;
+$$ LANGUAGE plpython3u;
 
 -- illegal: can't return non-None value in void-returning func
 CREATE FUNCTION test_void_func2() RETURNS void AS $$
 return 10
-$$ LANGUAGE plpythonu;
+$$ LANGUAGE plpython3u;
 
 CREATE FUNCTION test_return_none() RETURNS int AS $$
 None
-$$ LANGUAGE plpythonu;
+$$ LANGUAGE plpython3u;
 
 
 -- Tests for functions returning void
-- 
cgit v1.2.1

