From cc50080a828dd4791b43539f5a0f976e535d147c Mon Sep 17 00:00:00 2001
From: Tom Lane <tgl@sss.pgh.pa.us>
Date: Tue, 8 Feb 2022 15:30:38 -0500
Subject: Rearrange core regression tests to reduce cross-script dependencies.

The idea behind this patch is to make it possible to run individual
test scripts without running the entire core test suite.  Making all
the scripts completely independent would involve a massive rewrite,
and would probably be worse for coverage of things like concurrent DDL.
So this patch just does what seems practical with limited changes.

The net effect is that any test script can be run after running
limited earlier dependencies:
* all scripts depend on test_setup
* many scripts depend on create_index
* other dependencies are few in number, and are documented in
  the parallel_schedule file.

To accomplish this, I chose a small number of commonly-used tables
and moved their creation and filling into test_setup.  Later scripts
are expected not to modify these tables' data contents, for fear of
affecting other scripts' results.  Also, our former habit of declaring
all C functions in one place is now gone in favor of declaring them
where they're used, if that's just one script, or in test_setup if
necessary.

There's more that could be done to remove some of the remaining
inter-script dependencies, but significantly more-invasive changes
would be needed, and at least for now it doesn't seem worth it.

Discussion: https://postgr.es/m/1114748.1640383217@sss.pgh.pa.us
---
 src/test/regress/sql/float8.sql | 22 ++++++++--------------
 1 file changed, 8 insertions(+), 14 deletions(-)

(limited to 'src/test/regress/sql/float8.sql')

diff --git a/src/test/regress/sql/float8.sql b/src/test/regress/sql/float8.sql
index 97f0c3bb2f..03c134b078 100644
--- a/src/test/regress/sql/float8.sql
+++ b/src/test/regress/sql/float8.sql
@@ -2,7 +2,12 @@
 -- FLOAT8
 --
 
-CREATE TABLE FLOAT8_TBL(f1 float8);
+--
+-- Build a table for testing
+-- (This temporarily hides the table created in test_setup.sql)
+--
+
+CREATE TEMP TABLE FLOAT8_TBL(f1 float8);
 
 INSERT INTO FLOAT8_TBL(f1) VALUES ('    0.0   ');
 INSERT INTO FLOAT8_TBL(f1) VALUES ('1004.30  ');
@@ -229,20 +234,9 @@ INSERT INTO FLOAT8_TBL(f1) VALUES ('10e-400');
 
 INSERT INTO FLOAT8_TBL(f1) VALUES ('-10e-400');
 
--- maintain external table consistency across platforms
--- delete all values and reinsert well-behaved ones
-
-DELETE FROM FLOAT8_TBL;
-
-INSERT INTO FLOAT8_TBL(f1) VALUES ('0.0');
-
-INSERT INTO FLOAT8_TBL(f1) VALUES ('-34.84');
-
-INSERT INTO FLOAT8_TBL(f1) VALUES ('-1004.30');
-
-INSERT INTO FLOAT8_TBL(f1) VALUES ('-1.2345678901234e+200');
+DROP TABLE FLOAT8_TBL;
 
-INSERT INTO FLOAT8_TBL(f1) VALUES ('-1.2345678901234e-200');
+-- Check the float8 values exported for use by other tests
 
 SELECT * FROM FLOAT8_TBL;
 
-- 
cgit v1.2.1

