\documentclass{article}

\headsep=0pt
\topmargin=0pt
\headheight=0pt
\oddsidemargin=0pt
\textwidth=6.5in
\textheight=9in

\usepackage{xspace}
\usepackage{verbatim}
\newcommand{\fpy}{\texttt{f2py}\xspace}
\newcommand{\bs}{\symbol{`\\}}
\newcommand{\email}[1]{\special{html:<A href="mailto:#1">}\texttt{<#1>}\special{html:</A>}}
\title{\texttt{PyFortranObject} --- example usages}
\author{
\large Pearu Peterson\\
\small \email{pearu@cens.ioc.ee}
}

\begin{document}

\maketitle

\special{html: Other formats of this document:
<A href=pyfobj.ps.gz>Gzipped PS</A>,
<A href=pyfobj.pdf>PDF</A>
}

\tableofcontents

\section{Introduction}
\label{sec:intro}

Fortran language defines the following concepts that we would like to
access from Python: functions, subroutines, data in \texttt{COMMON} blocks,
F90 module functions and subroutines, F90 module data (both static and
allocatable arrays).

In the following we shall assume that we know the signatures (full
specifications of routine arguments and variables) of these concepts
from their Fortran source codes.  Now, in order to call or use them
from C, one needs to have pointers to the corresponding objects. The
pointers to Fortran 77 objects (routines, data in \texttt{COMMON}
blocks) are readily available to C codes (there are various sources
available about mixing Fortran 77 and C codes). On the other hand, F90
module specifications are highly compiler dependent and sometimes it
is not even possible to access F90 module objects from C (at least,
not directly, see remark about MIPSPro 7 Compilers). But using some
tricks (described below), the pointers to F90 module objects can be
determined in runtime providing a compiler independent solution.

To use Fortran objects from Python in unified manner, \fpy introduces
\texttt{PyFortranObject} to hold pointers of the Fortran objects and
the corresponing wrapper functions.  In fact, \texttt{PyFortranObject}
does much more: it generates documentation strings in run-time (for
items in \texttt{COMMON} blocks and data in F90 modules), provides
methods for accessing Fortran data and for calling Fortran routines,
etc.

\section{\texttt{PyFortranObject}}
\label{sec:pyfortobj}

\texttt{PyFortranObject} is defined as follows
\begin{verbatim}
typedef struct {
  PyObject_HEAD
  int len;                   /* Number of attributes */
  FortranDataDef *defs;      /* An array of FortranDataDef's */ 
  PyObject       *dict;      /* Fortran object attribute dictionary */
} PyFortranObject;
\end{verbatim}
where \texttt{FortranDataDef} is
\begin{verbatim}
typedef struct {
  char *name;                /* attribute (array||routine) name */
  int rank;                  /* array rank, 0 for scalar, max is F2PY_MAX_DIMS,
                                || rank=-1 for Fortran routine */
  struct {int d[F2PY_MAX_DIMS];} dims;  /* dimensions of the array, || not used */
  int type;                  /* PyArray_<type> || not used */
  char *data;                /* pointer to array || Fortran routine */
  void (*func)();            /* initialization function for
                                allocatable arrays:
                                func(&rank,dims,set_ptr_func,name,len(name))
                                || C/API wrapper for Fortran routine */
  char *doc;                 /* documentation string; only recommended
                                for routines. */
} FortranDataDef;
\end{verbatim}
In the following we demonstrate typical usages of
\texttt{PyFortranObject}. Just relevant code fragments will be given.


\section{Fortran 77 subroutine}
\label{sec:f77subrout}

Consider Fortran 77 subroutine
\begin{verbatim}
subroutine bar()
end
\end{verbatim}
The corresponding \texttt{PyFortranObject} is defined in C as follows:
\begin{verbatim}
static char doc_bar[] = "bar()";
static PyObject *c_bar(PyObject *self, PyObject *args,
                       PyObject *keywds, void (*f2py_func)()) {
  static char *capi_kwlist[] = {NULL};
  if (!PyArg_ParseTupleAndKeywords(args,keywds,"|:bar",capi_kwlist))
    return NULL;
  (*f2py_func)();
  return Py_BuildValue("");
}
extern void F_FUNC(bar,BAR)();
static FortranDataDef f2py_routines_def[] = {
  {"bar",-1, {-1}, 0, (char *)F_FUNC(bar,BAR),(void*)c_bar,doc_bar},
  {NULL}
};
void initfoo() {
  <snip>
  d = PyModule_GetDict(m);
  PyDict_SetItemString(d, f2py_routines_def[0].name,
                       PyFortranObject_NewAsAttr(&f2py_routines_def[0]));
}
\end{verbatim}
where CPP macro \texttt{F\_FUNC} defines how Fortran 77 routines are
seen in C.
In Python, Fortran subroutine \texttt{bar} is called as follows
\begin{verbatim}
>>> import foo
>>> foo.bar()
\end{verbatim}

\section{Fortran 77 function}
\label{sec:f77func}
Consider Fortran 77 function
\begin{verbatim}
function bar()
complex bar
end
\end{verbatim}
The corresponding \texttt{PyFortranObject} is defined in C as in
previous example but with the following changes:
\begin{verbatim}
static char doc_bar[] = "bar = bar()";
static PyObject *c_bar(PyObject *self, PyObject *args,
                       PyObject *keywds, void (*f2py_func)()) {
  complex_float bar;
  static char *capi_kwlist[] = {NULL};
  if (!PyArg_ParseTupleAndKeywords(args,keywds,"|:bar",capi_kwlist))
    return NULL;
  (*f2py_func)(&bar);
  return Py_BuildValue("O",pyobj_from_complex_float1(bar));
}
extern void F_WRAPPEDFUNC(bar,BAR)();
static FortranDataDef f2py_routines_def[] = {
  {"bar",-1,{-1},0,(char *)F_WRAPPEDFUNC(bar,BAR),(void *)c_bar,doc_bar},
  {NULL}
};
\end{verbatim}
where CPP macro \texttt{F\_WRAPPEDFUNC} gives the pointer to the following
Fortran 77 subroutine:
\begin{verbatim}
subroutine f2pywrapbar (barf2pywrap)
external bar
complex bar, barf2pywrap
barf2pywrap = bar()
end
\end{verbatim}
With these hooks, calling Fortran functions returning composed types
becomes platform/compiler independent.


\section{\texttt{COMMON} block data}
\label{sec:commondata}

Consider Fortran 77 \texttt{COMMON} block
\begin{verbatim}
integer i
COMMON /bar/ i
\end{verbatim}
In order to access the variable \texttt{i} from Python,
\texttt{PyFortranObject} is defined as follows:
\begin{verbatim}
static FortranDataDef f2py_bar_def[] = {
  {"i",0,{-1},PyArray_INT},
  {NULL}
};
static void f2py_setup_bar(char *i) {
  f2py_bar_def[0].data = i;
}
extern void F_FUNC(f2pyinitbar,F2PYINITBAR)();
static void f2py_init_bar() {
  F_FUNC(f2pyinitbar,F2PYINITBAR)(f2py_setup_bar);
}
void initfoo() {
  <snip>
  PyDict_SetItemString(d, "bar", PyFortranObject_New(f2py_bar_def,f2py_init_bar));
}
\end{verbatim}
where auxiliary Fortran function \texttt{f2pyinitbar} is defined as follows
\begin{verbatim}
subroutine f2pyinitbar(setupfunc)
external setupfunc
integer i
common /bar/ i
call setupfunc(i)
end
\end{verbatim}
and it is called in \texttt{PyFortranObject\_New}.


\section{Fortran 90 module subroutine}
\label{sec:f90modsubrout}

Consider
\begin{verbatim}
module fun
  subroutine bar()
  end subroutine bar
end module fun
\end{verbatim}
\texttt{PyFortranObject} is defined as follows
\begin{verbatim}
static char doc_fun_bar[] = "fun.bar()";
static PyObject *c_fun_bar(PyObject *self, PyObject *args, 
                           PyObject *keywds, void (*f2py_func)()) {
  static char *kwlist[] = {NULL};
  if (!PyArg_ParseTupleAndKeywords(args,keywds,"",kwlist))
    return NULL;
  (*f2py_func)();
  return Py_BuildValue("");
}
static FortranDataDef f2py_fun_def[] = {
  {"bar",-1,{-1},0,NULL,(void *)c_fun_bar,doc_fun_bar},
  {NULL}
};
static void f2py_setup_fun(char *bar) {
  f2py_fun_def[0].data = bar;
}
extern void F_FUNC(f2pyinitfun,F2PYINITFUN)();
static void f2py_init_fun() {
  F_FUNC(f2pyinitfun,F2PYINITFUN)(f2py_setup_fun);
}
void initfoo () {
  <snip>
  PyDict_SetItemString(d, "fun", PyFortranObject_New(f2py_fun_def,f2py_init_fun));
}
\end{verbatim}
where auxiliary Fortran function \texttt{f2pyinitfun} is defined as
follows
\begin{verbatim}
subroutine f2pyinitfun(f2pysetupfunc)
use fun
external f2pysetupfunc
call f2pysetupfunc(bar)
end subroutine f2pyinitfun
\end{verbatim}
The following Python session demonstrates how to call Fortran 90
module function \texttt{bar}:
\begin{verbatim}
>>> import foo
>>> foo.fun.bar()
\end{verbatim}

\section{Fortran 90 module function}
\label{sec:f90modfunc}

Consider
\begin{verbatim}
module fun
  function bar()
    complex bar
  end subroutine bar
end module fun
\end{verbatim}
\texttt{PyFortranObject} is defined as follows
\begin{verbatim}
static char doc_fun_bar[] = "bar = fun.bar()";
static PyObject *c_fun_bar(PyObject *self, PyObject *args, 
                           PyObject *keywds, void (*f2py_func)()) {
  complex_float bar;
  static char *kwlist[] = {NULL};
  if (!PyArg_ParseTupleAndKeywords(args,keywds,"",kwlist))
    return NULL;
  (*f2py_func)(&bar);
  return Py_BuildValue("O",pyobj_from_complex_float1(bar));
}
static FortranDataDef f2py_fun_def[] = {
  {"bar",-1,{-1},0,NULL,(void *)c_fun_bar,doc_fun_bar},
  {NULL}
};
static void f2py_setup_fun(char *bar) {
  f2py_fun_def[0].data = bar;
}
extern void F_FUNC(f2pyinitfun,F2PYINITFUN)();
static void f2py_init_fun() {
  F_FUNC(f2pyinitfun,F2PYINITFUN)(f2py_setup_fun);
}
void initfoo() {
  <snip>
  PyDict_SetItemString(d, "fun", PyFortranObject_New(f2py_fun_def,f2py_init_fun));
}
\end{verbatim}
where
\begin{verbatim}
subroutine f2pywrap_fun_bar (barf2pywrap)
use fun
complex barf2pywrap
barf2pywrap = bar()
end

subroutine f2pyinitfun(f2pysetupfunc)
external f2pysetupfunc,f2pywrap_fun_bar
call f2pysetupfunc(f2pywrap_fun_bar)
end
\end{verbatim}


\section{Fortran 90 module data}
\label{sec:f90moddata}

Consider
\begin{verbatim}
module fun
  integer i
end module fun
\end{verbatim}
Then
\begin{verbatim}
static FortranDataDef f2py_fun_def[] = {
  {"i",0,{-1},PyArray_INT},
  {NULL}
};
static void f2py_setup_fun(char *i) {
  f2py_fun_def[0].data = i;
}
extern void F_FUNC(f2pyinitfun,F2PYINITFUN)();
static void f2py_init_fun() {
  F_FUNC(f2pyinitfun,F2PYINITFUN)(f2py_setup_fun);
}
void initfoo () {
  <snip>
  PyDict_SetItemString(d, "fun",
                       PyFortranObject_New(f2py_fun_def,f2py_init_fun));
}
\end{verbatim}
where
\begin{verbatim}
subroutine f2pyinitfun(f2pysetupfunc)
use fun
external f2pysetupfunc
call f2pysetupfunc(i)
end subroutine f2pyinitfun
\end{verbatim}
Example usage in Python:
\begin{verbatim}
>>> import foo
>>> foo.fun.i = 4
\end{verbatim}

\section{Fortran 90 module allocatable array}
\label{sec:f90modallocarr}

Consider
\begin{verbatim}
module fun
  real, allocatable :: r(:)
end module fun
\end{verbatim}
Then
\begin{verbatim}
static FortranDataDef f2py_fun_def[] = {
  {"r",1,{-1},PyArray_FLOAT},
  {NULL}
};
static void f2py_setup_fun(void (*r)()) {
  f2py_fun_def[0].func = r;
}
extern void F_FUNC(f2pyinitfun,F2PYINITFUN)();
static void f2py_init_fun() {
  F_FUNC(f2pyinitfun,F2PYINITFUN)(f2py_setup_fun);
}
void initfoo () {
  <snip>
  PyDict_SetItemString(d, "fun", PyFortranObject_New(f2py_fun_def,f2py_init_fun));
}
\end{verbatim}
where
\begin{verbatim}
subroutine f2py_fun_getdims_r(r,s,f2pysetdata)
use fun, only: d => r
external f2pysetdata
logical ns
integer s(*),r,i,j
ns = .FALSE.
if (allocated(d)) then
  do i=1,r
    if ((size(d,r-i+1).ne.s(i)).and.(s(i).ge.0)) then
      ns = .TRUE.
    end if
  end do
  if (ns) then 
    deallocate(d) 
  end if
end if
if ((.not.allocated(d)).and.(s(1).ge.1)) then
  allocate(d(s(1)))
end if
if (allocated(d)) then
  do i=1,r
    s(i) = size(d,r-i+1)
  end do
end if
call f2pysetdata(d,allocated(d))
end subroutine f2py_fun_getdims_r

subroutine f2pyinitfun(f2pysetupfunc)
use fun
external f2pysetupfunc,f2py_fun_getdims_r
call f2pysetupfunc(f2py_fun_getdims_r)
end subroutine f2pyinitfun
\end{verbatim}
Usage in Python:
\begin{verbatim}
>>> import foo
>>> foo.fun.r = [1,2,3,4]
\end{verbatim}

\section{Callback subroutine}
\label{sec:cbsubr}

Thanks to Travis Oliphant for working out the basic idea of the
following callback mechanism.

Consider
\begin{verbatim}
subroutine fun(bar)
external bar
call bar(1)
end
\end{verbatim}
Then
\begin{verbatim}
static char doc_foo8_fun[] = "
Function signature:
  fun(bar,[bar_extra_args])
Required arguments:
  bar : call-back function
Optional arguments:
  bar_extra_args := () input tuple
Call-back functions:
  def bar(e_1_e): return
  Required arguments:
    e_1_e : input int";
static PyObject *foo8_fun(PyObject *capi_self, PyObject *capi_args, 
                      PyObject *capi_keywds, void (*f2py_func)()) {
  PyObject *capi_buildvalue = NULL;
  PyObject *bar_capi = Py_None;
  PyTupleObject *bar_xa_capi = NULL;
  PyTupleObject *bar_args_capi = NULL;
  jmp_buf bar_jmpbuf;
  int bar_jmpbuf_flag = 0;
  int bar_nofargs_capi = 0;
  static char *capi_kwlist[] = {"bar","bar_extra_args",NULL};

  if (!PyArg_ParseTupleAndKeywords(capi_args,capi_keywds,\
    "O!|O!:foo8.fun",\
    capi_kwlist,&PyFunction_Type,&bar_capi,&PyTuple_Type,&bar_xa_capi))
    goto capi_fail;

  bar_nofargs_capi = cb_bar_in_fun__user__routines_nofargs;
  if (create_cb_arglist(bar_capi,bar_xa_capi,1,0,
      &cb_bar_in_fun__user__routines_nofargs,&bar_args_capi)) {
    if ((PyErr_Occurred())==NULL)
      PyErr_SetString(foo8_error,"failed in processing argument list for call-back bar." );
    goto capi_fail;
  }

  SWAP(bar_capi,cb_bar_in_fun__user__routines_capi,PyObject);
  SWAP(bar_args_capi,cb_bar_in_fun__user__routines_args_capi,PyTupleObject);
  memcpy(&bar_jmpbuf,&cb_bar_in_fun__user__routines_jmpbuf,sizeof(jmp_buf));
  bar_jmpbuf_flag = 1;

  if ((setjmp(cb_bar_in_fun__user__routines_jmpbuf))) {
    if ((PyErr_Occurred())==NULL)
      PyErr_SetString(foo8_error,"Failure of a callback function");
    goto capi_fail;
  } else
    (*f2py_func)(cb_bar_in_fun__user__routines);

  capi_buildvalue = Py_BuildValue("");
capi_fail:

  if (bar_jmpbuf_flag) {
    cb_bar_in_fun__user__routines_capi = bar_capi;
    Py_DECREF(cb_bar_in_fun__user__routines_args_capi);
    cb_bar_in_fun__user__routines_args_capi = bar_args_capi;
    cb_bar_in_fun__user__routines_nofargs = bar_nofargs_capi;
    memcpy(&cb_bar_in_fun__user__routines_jmpbuf,&bar_jmpbuf,sizeof(jmp_buf));
    bar_jmpbuf_flag = 0;
  }
  return capi_buildvalue;
}
extern void F_FUNC(fun,FUN)();
static FortranDataDef f2py_routine_defs[] = {
  {"fun",-1,{-1},0,(char *)F_FUNC(fun,FUN),(void *)foo8_fun,doc_foo8_fun},
  {NULL}
};
void initfoo8 () {
  <snip>
  PyDict_SetItemString(d, f2py_routine_defs[0].name,
                       PyFortranObject_NewAsAttr(&f2py_routine_defs[0]));
}
\end{verbatim}
where
\begin{verbatim}
PyObject *cb_bar_in_fun__user__routines_capi = Py_None;
PyTupleObject *cb_bar_in_fun__user__routines_args_capi = NULL;
int cb_bar_in_fun__user__routines_nofargs = 0;
jmp_buf cb_bar_in_fun__user__routines_jmpbuf;
static void cb_bar_in_fun__user__routines (int *e_1_e_cb_capi) {
  PyTupleObject *capi_arglist = cb_bar_in_fun__user__routines_args_capi;
  PyObject *capi_return = NULL;
  PyObject *capi_tmp = NULL;
  int capi_j,capi_i = 0;

  int e_1_e=(*e_1_e_cb_capi);
  if (capi_arglist == NULL)
    goto capi_fail;
  if (cb_bar_in_fun__user__routines_nofargs>capi_i)
    if (PyTuple_SetItem((PyObject *)capi_arglist,capi_i++,pyobj_from_int1(e_1_e)))
      goto capi_fail;

  capi_return = PyEval_CallObject(cb_bar_in_fun__user__routines_capi,
                                  (PyObject *)capi_arglist);

  if (capi_return == NULL)
    goto capi_fail;
  if (capi_return == Py_None) {
    Py_DECREF(capi_return);
    capi_return = Py_BuildValue("()");
  }
  else if (!PyTuple_Check(capi_return)) {
    capi_tmp = capi_return;
    capi_return = Py_BuildValue("(O)",capi_tmp);
    Py_DECREF(capi_tmp);
  }
  capi_j = PyTuple_Size(capi_return);
  capi_i = 0;
  goto capi_return_pt;
capi_fail:
  fprintf(stderr,"Call-back cb_bar_in_fun__user__routines failed.\n");
  Py_XDECREF(capi_return);
  longjmp(cb_bar_in_fun__user__routines_jmpbuf,-1);
capi_return_pt:
  ;
}
\end{verbatim}
Usage in Python:
\begin{verbatim}
>>> import foo8 as foo
>>> def bar(i): print 'In bar i=',i
...
>>> foo.fun(bar)
In bar i= 1
\end{verbatim}

\end{document}


%%% Local Variables: 
%%% mode: latex
%%% TeX-master: t
%%% End: 
